DROP TABLE IF EXISTS `xref_type`;
/*!40101 SET @saved_cs_client     = @@character_set_client */;
/*!40101 SET character_set_client = utf8 */;
CREATE TABLE `xref_type` (
  `name` varchar(255) COLLATE utf8_unicode_ci NOT NULL,
  `description` text COLLATE utf8_unicode_ci,
  `url` text COLLATE utf8_unicode_ci,
  `eg_q_url` text COLLATE utf8_unicode_ci,
  PRIMARY KEY (`name`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci;
/*!40101 SET character_set_client = @saved_cs_client */;

--
-- Dumping data for table `xref_type`
--

LOCK TABLES `xref_type` WRITE;
/*!40000 ALTER TABLE `xref_type` DISABLE KEYS */;
INSERT INTO `xref_type` VALUES ('BRENDA',NULL,NULL,NULL),('ChEMBL',NULL,NULL,NULL),('DrugBank',NULL,NULL,NULL),('Ensembl',NULL,NULL,NULL),('ENSG','Ensembl Gene ID',NULL,NULL),('HGNC',NULL,NULL,NULL),('InterPro',NULL,NULL,NULL),('L1000 ID','CMap landmark gene ID. See http://support.lincscloud.org/hc/en-us/articles/202092616-The-Landmark-Genes',NULL,NULL),('MGI ID',NULL,NULL,NULL),('MIM',NULL,NULL,NULL),('NCBI GI',NULL,NULL,NULL),('PANTHER',NULL,NULL,NULL),('PDB',NULL,NULL,NULL),('Pfam',NULL,NULL,NULL),('PROSITE',NULL,NULL,NULL),('PubMed',NULL,NULL,NULL),('RefSeq','RefSeq mappings loaded from UniProt XML',NULL,NULL),('SMART',NULL,NULL,NULL),('STRING','STRING ENSP mappings loaded from UniProt XML',NULL,NULL),('UniGene',NULL,NULL,NULL),('UniProt Keyword','UniProt keyword ids and values',NULL,NULL);
/*!40000 ALTER TABLE `xref_type` ENABLE KEYS */;
UNLOCK TABLES;
